ALTER TABLE `entPhysical` CHANGE `entPhysicalContainedIn` `entPhysicalContainedIn` INT NULL DEFAULT NULL, CHANGE `entPhysicalParentRelPos` `entPhysicalParentRelPos` INT NULL DEFAULT NULL;
