ALTER TABLE `devices` ADD `label` VARCHAR(253) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL AFTER `sysName`, ADD `ip` VARCHAR(128) CHARACTER SET latin1 COLLATE latin1_general_ci NULL DEFAULT NULL AFTER `label`;