ALTER TABLE `processors` CHANGE `processor_descr` `processor_descr` VARCHAR(255) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL;
ALTER TABLE `printersupplies` CHANGE `supply_descr` `supply_descr` VARCHAR(255) CHARACTER SET utf8 COLLATE utf8_unicode_ci NOT NULL;
ALTER TABLE `lsp` CHANGE `lsp_mib` `lsp_mib` VARCHAR(64) CHARACTER SET latin1 COLLATE latin1_general_ci NULL DEFAULT NULL, CHANGE `lsp_index` `lsp_index` VARCHAR(64) CHARACTER SET latin1 COLLATE latin1_general_ci NOT NULL, CHANGE `lsp_name` `lsp_name` VARCHAR(255) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL, CHANGE `lsp_state` `lsp_state` ENUM('unknown','up','down','notInService','backupActive') CHARACTER SET latin1 COLLATE latin1_general_ci NULL DEFAULT 'unknown', CHANGE `lsp_proto` `lsp_proto` VARCHAR(32) CHARACTER SET latin1 COLLATE latin1_general_ci NOT NULL;
