ALTER TABLE `counters` CHANGE `counter_value` `counter_value` DOUBLE(14,5) NULL DEFAULT NULL;
ALTER TABLE `sensors` CHANGE `sensor_value` `sensor_value` DOUBLE(14,5) NULL DEFAULT NULL;
