ALTER TABLE `mempools` ADD `mempool_oid_free`  VARCHAR(128) NOT NULL;
ALTER TABLE `mempools` ADD `mempool_oid_total` VARCHAR(128) NOT NULL;
ALTER TABLE `mempools` ADD `mempool_oid_used`  VARCHAR(128) NOT NULL;
