ALTER TABLE  `sensors` CHANGE  `sensor_divisor`  `sensor_divisor` FLOAT NOT NULL DEFAULT  '1', CHANGE  `sensor_multiplier`  `sensor_multiplier` FLOAT NOT NULL DEFAULT  '1';
