ALTER TABLE `ports-state` CHANGE `ifInOctets_perc` `ifInOctets_perc` INT NULL DEFAULT NULL;
ALTER TABLE `ports-state` CHANGE `ifOutOctets_perc` `ifOutOctets_perc` INT NULL DEFAULT NULL;
