ALTER TABLE `alert_log` CHANGE `log_type` `log_type` ENUM('ALERT_NOTIFY','REMINDER_NOTIFY','FAIL','FAIL_DELAYED','FAIL_SUPPRESSED','OK','RECOVER_NOTIFY','RECOVER_SUPPRESSED') CHARACTER SET latin1 COLLATE latin1_general_ci NULL DEFAULT NULL;
